<!--
  - ExampleComponent.vue
  - Copyright (c) 2019 thegrumpydictator@gmail.com
  -
  - This file is part of Firefly III.
  -
  - Firefly III is free software: you can redistribute it and/or modify
  - it under the terms of the GNU General Public License as published by
  - the Free Software Foundation, either version 3 of the License, or
  - (at your option) any later version.
  -
  - Firefly III is distributed in the hope that it will be useful,
  - but WITHOUT ANY WARRANTY; without even the implied warranty of
  - MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
  - GNU General Public License for more details.
  -
  - You should have received a copy of the GNU General Public License
  - along with Firefly III. If not, see <http://www.gnu.org/licenses/>.
  -->

<!-- TODO REMOVE ME -->
<template>
    <div class="container">
        <div class="row">
            <div class="col-md-8 col-md-offset-2">
                <div class="panel panel-default">
                    <div class="panel-heading">Example Component</div>

                    <div class="panel-body">
                        I'm an example component!
                    </div>
                </div>
            </div>
        </div>
    </div>
</template>

<script>
    export default {
        mounted() {
            console.log('Component mounted.')
        }
    }
</script>
